-- ----------------------------
-- Records of sys_config
-- ----------------------------
INSERT INTO `sys_config` VALUES ('181435112951382016', '第一次登陆修改密码', 'FIRST_LOGIN_CHANGE_PASSWORD', '1', '0', '1是,0否', '00000000', '999999', '2019-01-10 11:48:20', '2019-01-10', NULL, NULL, NULL, NULL, 1);
INSERT INTO `sys_config` VALUES ('388726043608879104', '密码正则校验', 'PASSWORD_REGEX', '^(?=.*[a-z])(?=.*[A-Z])(?=.*\\d)(?=.*[$@$!%*?&])[A-Za-z\\d$@$!%*?&]{8,20}', '0', '必须包含大小写字母、数字、特殊字符，长度8-20位', '00000000', '999999', '2020-08-04 16:18:30', '2020-08-04', NULL, NULL, NULL, NULL, 1);
INSERT INTO `sys_config` VALUES ('388726043608879107', '连续输入错误密码锁定账号功能参数集', 'CONTINUOUS_ERROR_PASSWORD_PARA_SET', '1,3,24', '0', '格式(持续时间[分钟,整数],连续次数[正整数],锁定时间[小时,整数])', '00000000', '999999', '2020-08-04 16:18:30', '2020-08-04', NULL, NULL, NULL, NULL, 1);
INSERT INTO `sys_config` VALUES ('461860138098098176', '是否满足两增两控标识', 'TWO_ADD_TWO_CTRL_FLAG', '1', '1', '1是0否', '00000000', '999999', '2021-02-22 11:47:18', '2021-02-22', NULL, NULL, NULL, NULL, 1);
INSERT INTO `sys_config` VALUES ('462369217388216320', '是否允许同一账户多浏览器登录', 'ALLOW_SAME_ACCOUNT_DIFFERENT_BROWSERS', '1', '1', '1是0否', '00000000', '999999', '2021-02-22 11:47:18', '2021-02-22', '00000000', '999999', '2021-12-11 18:21:59', '2036-03-11', 1);
INSERT INTO `sys_config` VALUES ('493364091583201280', '交易重跑时间间隔', 'TRANSACTION_RETRY_INTERVAL', '3', '1', '单位：分钟', '00000000', '999999', '2021-05-20 10:12:46', '2021-05-20', NULL, NULL, NULL, NULL, 1);
INSERT INTO `sys_config` VALUES ('493364170624860160', '交易重跑重试次数', 'TRANSACTION_RETRY_TIMES', '3', '1', NULL, '00000000', '999999', '2021-05-20 10:13:05', '2021-05-20', NULL, NULL, NULL, NULL, 1);
INSERT INTO `sys_config` VALUES ('493364170624860161', '是否强制调用公安联网核查', 'IS_INVOKE_GA_CIVS', '1', '1', '1是0否', '00000000', '999999', '2021-05-20 10:13:05', '2021-05-20', NULL, NULL, NULL, NULL, 1);